en	This form should not contain extra fields.
und	Feltgruppen må ikke inneholde ekstra felter.

en	The uploaded file was too large. Please try to upload a smaller file.
und	Den opplastede filen var for stor. Vennligst last opp en mindre fil.

en	The CSRF token is invalid.
und	CSRF nøkkelen er ugyldig.