en	This form should not contain extra fields.
und	Feltgruppen må ikke indeholde ekstra felter.

en	The uploaded file was too large. Please try to upload a smaller file.
und	Den uploadede fil var for stor. Upload venligst en mindre fil.

en	The CSRF token is invalid. Please try to resubmit the form.
und	CSRF-token er ugyldig.